Rumors suggest that Nokia 9.3 might have 120Hz display and 108MP camera

HMD Global was expected to launch its upcoming smartphone at Mobile World Congress (MWC) in Barcelona but the company had to delay the release due to coronavirus pandemic. The company called the successor of the Nokia 9 as a Nokia 9.3 PureView. A fresh wave of leaks suggests that the next smartphone is said to feature 108-megapixel primary camera and 120Hz display. The smartphone might feature an array of camera sensors at the rear side – just like the Nokia 9 PureView. One of these camera sensors will be able to offer the optical image stabilization technique as well. The phone is now expected to available in the second half of this year after the first release was canceled due to coronavirus situation.

A reputable Nokia Tipster has shared some leaks about the smartphone. The phone might be using either a 108-megapixel sensor from Samsung or a 64-megapixel sensor from Sony. These sensors will be used to record video from the mobile camera. As per leaks, HMD CPO wanted to use only the 108-megapixel sensor and abandon the system of simultaneous operation of several sensors. The configuration of other cameras is unknown right now, but it is safe to guess that there will be telephoto, macro, and depth sensors along with the primary camera.

To display a high-refresh-rate at 120Hz the phone needs a high-capacity processor under the hood. The company will use the OLED screen on the display and a powerful Snapdragon 865 processor. The previous model used Qualcomm Snapdragon 855 plus. Another leak suggests the color options – Polar night, bold and lighter shades similar to copper hues HMD Global has already introduced before.